; HTBDisp.def : Declares the module parameters for the DLL.

LIBRARY      "HTBDisp"
DESCRIPTION  'HTBDisp Windows Dynamic Link Library'

EXPORTS
    ; Explicit exports can go here
	Dlldisp
